0 2 4 6 8 10 12 P K_L(GeV/c) 0

40

80

120

160

200

240 events

MINUIT Likelihood Fit to Plot 10ω0

P K_L Fileϑ Generated internally 27-SEP-2001 00ϑ36 Plot Area Total/Fit 2326.0 / 2326.0 Func Area Total/Fit 2325.9 / 2325.9

Fit Status 3 E.D.M. 2.944E-06

Likelihood = 38.9 χ^2= 34.6 for 30 - 5 d.o.f., C.L.= 9.5Ψ

Errors Parabolic Minos Function 1ϑ KLMON NORMALIZE 192.03 Α 5.875 - 5.769 + 5.927 MEAN 2.0270 Α 8.3418E-02 - 8.3806E-02 + 8.5044E-02 SIGMA 1.7385 Α 7.2594E-02 - 7.0553E-02 + 7.4430E-02 OFFSET -0.31790 Α 2.5992E-02 - 2.7269E-02 + 2.6124E-02 SLOPE 2.31968E-02 Α 2.5073E-03 - 2.5041E-03 + 2.5830E-03