0 2 4 6 8 10 12 P K_L(GeV/c) 0

100

200

300 events

MINUIT Likelihood Fit to Plot 10ω0

P K_L Fileϑ Generated internally 27-SEP-2001 13ϑ32 Plot Area Total/Fit 3113.0 / 3113.0 Func Area Total/Fit 3113.0 / 3113.0

Fit Status 3 E.D.M. 3.409E-07

Likelihood = 45.3 χ^2= 41.4 for 30 - 5 d.o.f., C.L.= 2.1Ψ

Errors Parabolic Minos Function 1ϑ KLMON NORMALIZE 259.75 Α 6.982 - 6.862 + 7.031 MEAN 1.9319 Α 6.9969E-02 - 6.9580E-02 + 7.0344E-02 SIGMA 1.6679 Α 6.2148E-02 - 6.0432E-02 + 6.3271E-02 OFFSET -0.34098 Α 2.4346E-02 - 2.4539E-02 + 2.3521E-02 SLOPE 2.42863E-02 Α 2.3025E-03 - 2.2393E-03 + 2.3106E-03